Art-room scenes with error-coded images

ε = 0.2. Magenta regions fail linearity test.

Plate 2: Bounded-Error Interactive Ray Tracing ε = 1.0. Interpolation succeeds in the gray-blue regions. The yellow and green regions fail discontinuity tests.

ε = 1.0. Red regions fail occluder-discontinuity test.